Title: Theory / Unimportant / Experimental / Constants / SI; / Prefix

Name: deci
Abbreviation: d
Exponant: -1

Name: centi
Abbreviation: c
Exponant: -2

Name: milli
Abbreviation: m
Exponant: -3

Name: micro
Abbreviation: \(\mu\)
Exponant: -6

Name: nano
Abbreviation: n
Exponant: -9

Name: pico
Abbreviation: p
Exponant: -12

Name: femto
Abbreviation: f
Exponant: -15

Name: atto
Abbreviation: a
Exponant: -18

Name: deka
Abbreviation: da
Exponant: 1

Name: hecto
Abbreviation: h
Exponant: 2

Name: kilo
Abbreviation: k
Exponant: 3

Name: mega
Abbreviation: M
Exponant: 6

Name: giga
Abbreviation: G
Exponant: 9

Name: tera
Abbreviation: T
Exponant: 12

Name: peta
Abbreviation: P
Exponant: 15

Name: Exa
Abbreviation: E
Exponant: 18

Name: Zetta
Abbreviation: Z
Exponant: 21

Name: Yotta
Abbreviation: Y
Exponant: 24

Name: zepto
Abbreviation: z
Exponant: -21

Name: yocto
Abbreviation: y
Exponant: -24

Name: 1 Pica
Definition: 4.233mm
Definition2: 12 point
Abbreviation: P̸