Title: Pratique / Instrument / Harmonica Diatonic / Notes; / Z Modified

Instrument name: harmonica diatonic
Degree: 1#
Function: tonic#
Height: very low

Instrument name: harmonica diatonic
Degree: 4#
Function: subdominant#
Height: low

Instrument name: harmonica diatonic
Degree: 7 (minor)
Function: Subtonic
Height: low

Instrument name: harmonica diatonic
Degree: 1#
Function: tonic#
Height: low middle

Instrument name: harmonica diatonic
Degree: 7 (minor)
Function: subtonic
Height: high

Instrument name: harmonica diatonic
Degree: 4#
Function: Subdominant#
Height: high

Instrument name: harmonica diatonic
Degree: 3♭
Function: Mediant b
Height: high

Instrument name: harmonica diatonic
Degree: 7 (major)
Function: leading
Height: high

Instrument name: harmonica diatonic
Degree: 1
Function: tonic
Height: very high

Instrument name: harmonica diatonic
Degree: 4
Function: subdominant
Height: low

Instrument name: harmonica diatonic
Degree: 6♭
Function: submediant b
Height: middle

Instrument name: harmonica diatonic
Degree: 6
Function: submediant
Height: low

Instrument name: harmonica diatonic
Degree: 6♭
Function: submediant b
Height: low